Dr. Strange[15] [f0210.05.c07.cln.fits:(1734.2,1897.0)]

     RA(2000) DEC(2000) offsets to SN PosA Mag
SN 02:11:06.90 -04:22:38.5 23.70
 g 02:11:06.87 -04:22:39.8 + 0.5"(E) + 1.3"(N) -157.5 20.83
 1 02:11:08.62 -04:22:12.9 - 25.7"(W) - 25.6"(S) 45.1 19.42
 2 02:11:04.55 -04:22:01.9 + 35.2"(E) - 36.7"(S) -43.9 16.20
 3 02:11:02.89 -04:21:55.8 + 59.9"(E) - 42.7"(S) -54.5 17.57
 4 02:11:02.41 -04:22:34.8 + 67.2"(E) - 3.8"(S) -86.8 16.11
 5 02:11:12.59 -04:23:24.9 - 85.1"(W) + 46.4"(N) 118.6 15.21
 6 02:11:09.00 -04:23:25.7 - 31.4"(W) + 47.2"(N) 146.3 19.78
 7 02:11:10.04 -04:22:27.6 - 46.9"(W) - 10.9"(S) 76.9 21.07
g1 02:11:06.54 -04:23:13.2 + 5.4"(E) + 34.7"(N) -171.1 19.91
 8 02:11:10.60 -04:21:44.4 - 55.4"(W) - 54.1"(S) 45.7 20.81
g2 02:11:10.85 -04:22:32.4 - 59.1"(W) - 6.1"(S) 84.1 19.81